\mbox{	3km tunnels	[TUN], 	}	&
\mbox{	center room	[TUN], 	}	&
\mbox{	two-story end rooms	[TUN], 	}	\\
\mbox{	Water drainage system	[TUN], 	}	&
\mbox{	entrance tunnel	[TUN], 	}	&
\mbox{	buildings	[FCL], 	}	\\
\mbox{	car parking	[FCL], 	}	&
\mbox{	power supply system	[FCL], 	}	&
\mbox{	clean assy rooms	[FCL], 	}	\\
\mbox{	air conditioners	[FCL], 	}	&
\mbox{	optical fibers	[FCL], 	}	&
\mbox{	cranes	[FCL], 	}	\\
\mbox{	thermometers	[GIF], 	}	&
\mbox{	seismometers	[GIF], 	}	&
\mbox{	particle meters	[GIF], 	}	\\
\mbox{	microphones	[GIF], 	}	&
\mbox{	hygrometers	[GIF], 	}	&
\mbox{	baseline interferometers	[GIF], 	}	\\
\mbox{	barometers	[GIF], 	}	&
\mbox{	accelerometers	[GIF], 	}	&
\\
